Bo = 6.0˚

-40˚

-30˚

-20˚

-10˚ 0˚ +10˚

+20˚

+30˚

+40˚

Bo = -6.0˚

-40˚

-30˚

-20˚

-10˚ 0˚ +10˚

+20˚

+30˚

+40˚